X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dface61ccba162c922b25d18aca2ebc4e6f03312..b953bdc2934895fa31d859be25be1f850701c2c3:/docs/latex/wx/droptrgt.tex?ds=sidebyside

diff --git a/docs/latex/wx/droptrgt.tex b/docs/latex/wx/droptrgt.tex
index 0198dda34e..3d38cc476c 100644
--- a/docs/latex/wx/droptrgt.tex
+++ b/docs/latex/wx/droptrgt.tex
@@ -70,3 +70,4 @@ Return TRUE to accept the data, FALSE to veto the operation.
 \func{virtual void}{OnLeave}{\void}
 
 Called when the mouse leaves the drop target.
+
