X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dfa13ec8d7c5d39a72f59d64c443ab3a46aacc19..1db1f1ede2e0cb7bbf412faf707f0a56959891da:/docs/latex/wx/settings.tex?ds=sidebyside

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index e78368a43f..2882173e62 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -152,9 +152,3 @@ where it would otherwise present the information only in audible form; zero othe
 \pythonnote{This static method is implemented in Python as a
 standalone function named \tt{wxSystemSettings_GetSystemMetric}}
 
-
-
-
-
-
-
