X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dfa13ec8d7c5d39a72f59d64c443ab3a46aacc19..0996d32a07f2b89d0f26ccf336398493445f2cc5:/docs/latex/wx/settings.tex

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index e78368a43f..39dede3d6c 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -69,7 +69,7 @@ Returns a system colour.
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named \tt{wxSystemSettings_GetSystemColour}}
+standalone function named {\tt wxSystemSettings_GetSystemColour}}
 
 \membersection{wxSystemSettings::GetSystemFont}\label{wxsystemsettingsgetsystemfont}
 
@@ -91,7 +91,7 @@ Not available in versions of Windows earlier than Windows 95 or Windows NT 4.0.}
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named \tt{wxSystemSettings_GetSystemFont}}
+standalone function named {\tt wxSystemSettings_GetSystemFont}}
 
 \membersection{wxSystemSettings::GetSystemMetric}\label{wxsystemsettingsgetsystemmetric}
 
@@ -150,11 +150,5 @@ where it would otherwise present the information only in audible form; zero othe
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named \tt{wxSystemSettings_GetSystemMetric}}
-
-
-
-
-
-
+standalone function named {\tt wxSystemSettings_GetSystemMetric}}
 
