X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/df348ff8c769dfeacec30f5873000c7d10027d30..d5706f3ee8a83947a639ff44a21df29c97b72682:/docs/latex/wx/odcbox.tex

diff --git a/docs/latex/wx/odcbox.tex b/docs/latex/wx/odcbox.tex
index 4d9ac66730..385326bf77 100644
--- a/docs/latex/wx/odcbox.tex
+++ b/docs/latex/wx/odcbox.tex
@@ -33,7 +33,11 @@ and \helpref{OnMeasureItemWidth()}{wxownerdrawncomboboxonmeasureitemwidth}.
 
 \wxheading{Include files}
 
-<odcombo.h>
+<wx/odcombo.h>
+
+\wxheading{Library}
+
+\helpref{wxAdv}{librarieslist}
 
 \wxheading{Window styles}
 
@@ -218,3 +222,4 @@ specified item (in pixels). If -1 is returned, then the item text width
 is used.
 
 The default implementation returns -1.
+
