X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/df18cc7aa1afdbe74d4b8e398d12ef34d1e78b5c..a607d8d633e055fc5cea22c0b829cd65b5c3dbfb:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index 9262f10486..90cd8c8840 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -8,6 +8,10 @@ None
 
 <wx/stream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxStreamBase}{wxstreambase}
