X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/defbed48e78f4e84b35f62c2c1b7fd58d740501c..cf0d7921e49b050a623bd4b0180abe721ce548f9:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 53152726d8..a47d026205 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -6,7 +6,7 @@
 %% Created:     14.01.02 (extracted from dllload.tex)
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDynamicLibrary}}\label{wxdynamiclibrary}
@@ -130,8 +130,8 @@ of all modules loaded into the address space of the current project, the array
 elements are object of \texttt{wxDynamicLibraryDetails} class. The array will
 be empty if an error occured.
 
-This method is currently only implemented under Win32 and is useful mostly for
-diagnostics purposes.
+This method is currently implemented only under Win32 and Linux and is useful
+mostly for diagnostics purposes.
 
 
 \membersection{wxDynamicLibrary::Load}\label{wxdynamiclibraryload}
