X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/defbed48e78f4e84b35f62c2c1b7fd58d740501c..bcf576ccfe754a634034203aa133c02fb5d2f964:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 53152726d8..c1c3dcc48f 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -130,8 +130,8 @@ of all modules loaded into the address space of the current project, the array
 elements are object of \texttt{wxDynamicLibraryDetails} class. The array will
 be empty if an error occured.
 
-This method is currently only implemented under Win32 and is useful mostly for
-diagnostics purposes.
+This method is currently implemented only under Win32 and Linux and is useful
+mostly for diagnostics purposes.
 
 
 \membersection{wxDynamicLibrary::Load}\label{wxdynamiclibraryload}
