X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/debc914bdccd720336f7fc6d82c1f2a704197f6a..c8abcf3309409049def4a410a4f2e9c6f89cb863:/docs/latex/wx/flexsizr.tex

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index 6b85373992..92c1f8d5c2 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -41,18 +41,25 @@ all children.
 
 \membersection{wxFlexGridSizer::AddGrowableCol}\label{wxflexgridsizeraddgrowablecol}
 
-\func{void}{AddGrowableCol}{\param{size\_t }{idx}}
+\func{void}{AddGrowableCol}{\param{size\_t }{idx}, \param{int }{proportion = $0$}}
 
-Specifies that column idx (starting from zero) should be grown if
+Specifies that column {\it idx} (starting from zero) should be grown if
 there is extra space available to the sizer.
 
+The {\it proportion} parameter has the same meaning as the stretch factor for
+the \helpref{sizers}{sizeroverview} except that if all proportions are $0$,
+then all columns are resized equally (instead of not being resized at all).
+
 \membersection{wxFlexGridSizer::AddGrowableRow}\label{wxflexgridsizeraddgrowablerow}
 
-\func{void}{AddGrowableRow}{\param{size\_t }{idx}}
+\func{void}{AddGrowableRow}{\param{size\_t }{idx}, \param{int }{proportion = $0$}}
 
 Specifies that row idx (starting from zero) should be grown if there
 is extra space available to the sizer.
 
+See \helpref{AddGrowableCol}{wxflexgridsizeraddgrowablecol} for the description
+of {\it proportion} parameter.
+
 \membersection{wxFlexGridSizer::GetFlexibleDirection}\label{wxflexgridsizergetflexibledrection}
 
 \constfunc{int}{GetFlexibleDirections}{\void}
