X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/de6019fb157459e7e7610e3ff813ad8c4a3225cf..d45d30c8682f858321600e2958167d7ef54ebeb5:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index 76ad6ce626..4109e8c490 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -45,8 +45,8 @@ first argument.
 does anything at all in the debug mode (when the preprocessor symbol
 \_\_WXDEBUG\_\_ is defined) and expands to nothing in release mode (otherwise).
 {\bf Tip:} under Windows, you must either run the program under debugger or
-use a 3rd party program such as DbgView (from 
-{\tt http://www.sysinternals.com}) to actually see the debug output.
+use a 3rd party program such as \urlref{DbgView}{http://www.sysinternals.com} 
+to actually see the debug output.
 \item{\bf wxLogTrace} as {\bf wxLogDebug} only does something in debug
 build. The reason for making it a separate function from it is that usually
 there are a lot of trace messages, so it might make sense to separate them
