X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/de6019fb157459e7e7610e3ff813ad8c4a3225cf..2686e01b0b0d6d5b59df7c1c979f7a047aab985d:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index 76ad6ce626..7db8f6c4ee 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -1,4 +1,4 @@
-\section{Log classes overview}\label{wxlogoverview}
+\section{wxLog classes overview}\label{wxlogoverview}
 
 Classes: \helpref{wxLog}{wxlog}, wxLogStderr,
 wxLogOstream, wxLogTextCtrl, wxLogWindow, wxLogGui, wxLogNull
@@ -45,8 +45,8 @@ first argument.
 does anything at all in the debug mode (when the preprocessor symbol
 \_\_WXDEBUG\_\_ is defined) and expands to nothing in release mode (otherwise).
 {\bf Tip:} under Windows, you must either run the program under debugger or
-use a 3rd party program such as DbgView (from 
-{\tt http://www.sysinternals.com}) to actually see the debug output.
+use a 3rd party program such as \urlref{DbgView}{http://www.sysinternals.com} 
+to actually see the debug output.
 \item{\bf wxLogTrace} as {\bf wxLogDebug} only does something in debug
 build. The reason for making it a separate function from it is that usually
 there are a lot of trace messages, so it might make sense to separate them
@@ -92,7 +92,7 @@ works.
 wxWindows has the notion of a {\it log target}: it's just a class deriving
 from \helpref{wxLog}{wxlog}. As such, it implements the virtual functions of
 the base class which are called when a message is logged. Only one log target
-is {\it active} at any moment, this is the one used by \it{wxLogXXX()}
+is {\it active} at any moment, this is the one used by {\it wxLogXXX()}
 functions. The normal usage of a log object (i.e. object of a class derived
 from wxLog) is to install it as the active target with a call to {\it
 SetActiveTarget()} and it will be used automatically by all subsequent calls
