X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ddca12cfd9c965963eb63751252000d03a12d9da..6e42617af493da590f7d08ed248be615ab817eee:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index 1c31d62d80..84510e7ee4 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -44,8 +44,8 @@ public:
         // tell the other(s) thread(s) that we're about to terminate: we must
         // lock the mutex first or we might signal the condition before the
         // waiting threads start waiting on it!
-        wxMutexLocker lock(m_mutex);
-        m_condition.Broadcast(); // same as Signal() here -- one waiter only
+        wxMutexLocker lock(*m_mutex);
+        m_condition->Broadcast(); // same as Signal() here -- one waiter only
 
         return 0;
     }
@@ -105,6 +105,10 @@ None.
 
 <wx/thread.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxThread}{wxthread}, \helpref{wxMutex}{wxmutex}
