X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ddca12cfd9c965963eb63751252000d03a12d9da..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index 1c31d62d80..cf3a6df608 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -105,6 +105,10 @@ None.
 
 <wx/thread.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxThread}{wxthread}, \helpref{wxMutex}{wxmutex}
