X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dd932cbe1c594a3adceaa521f0cf735b09810f4e..caddf9b41055eb11b13143361640dc733593b0a2:/docs/latex/wx/vscroll.tex?ds=sidebyside

diff --git a/docs/latex/wx/vscroll.tex b/docs/latex/wx/vscroll.tex
index d304d6f172..b965f1fd15 100644
--- a/docs/latex/wx/vscroll.tex
+++ b/docs/latex/wx/vscroll.tex
@@ -159,7 +159,7 @@ Returns the index of the first currently visible line.
 Returns the index of the first line after the currently visible one. If the
 return value is $0$ it means that no lines are currently shown (which only
 happens if the control is empty). Note that the index returned by this method
-is not always a valid index as it may be equal to \helpref{GetLineCount}{wxvscrolledwindowsetlinecount}.
+is not always a valid index as it may be equal to \helpref{GetLineCount}{wxvscrolledwindowgetlinecount}.
 
 \wxheading{See also}
 
@@ -186,7 +186,7 @@ Returns {\tt true} if the given line is (at least partially) visible or
 
 \membersection{wxVScrolledWindow::OnGetLineHeight}\label{wxvscrolledwindowongetlineheight}
 
-\constfunc{wxCoord}{OnGetLineHeight}{\param{size\_t }{n}}
+\constfunc{virtual wxCoord}{OnGetLineHeight}{\param{size\_t }{n}}
 
 This protected virtual function must be overridden in the derived class and it
 should return the height of the given line in pixels.
@@ -198,7 +198,7 @@ should return the height of the given line in pixels.
 
 \membersection{wxVScrolledWindow::OnGetLinesHint}\label{wxvscrolledwindowongetlineshint}
 
-\constfunc{void}{OnGetLinesHint}{\param{size\_t }{lineMin}, \param{size\_t }{lineMax}}
+\constfunc{virtual void}{OnGetLinesHint}{\param{size\_t }{lineMin}, \param{size\_t }{lineMax}}
 
 This function doesn't have to be overridden but it may be useful to do
 it if calculating the lines heights is a relatively expensive operation
