X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dd932cbe1c594a3adceaa521f0cf735b09810f4e..226de48a85fdfc8ada9c5fa942f94eecc7dc7f8c:/docs/latex/wx/vscroll.tex

diff --git a/docs/latex/wx/vscroll.tex b/docs/latex/wx/vscroll.tex
index d304d6f172..95892a7a01 100644
--- a/docs/latex/wx/vscroll.tex
+++ b/docs/latex/wx/vscroll.tex
@@ -159,7 +159,7 @@ Returns the index of the first currently visible line.
 Returns the index of the first line after the currently visible one. If the
 return value is $0$ it means that no lines are currently shown (which only
 happens if the control is empty). Note that the index returned by this method
-is not always a valid index as it may be equal to \helpref{GetLineCount}{wxvscrolledwindowsetlinecount}.
+is not always a valid index as it may be equal to \helpref{GetLineCount}{wxvscrolledwindowgetlinecount}.
 
 \wxheading{See also}
 
