X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dd91da4ed1e9d2ba5d3bc2fae64a8e4ea86b5d41..a49686b4c29e431ed24b14fae4d97140d447a149:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 12f14173e8..48de0b04a7 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -447,6 +447,12 @@ Returns the value used for packing tools.
 
 \helpref{wxToolBar::SetToolPacking}{wxtoolbarsettoolpacking}
 
+\membersection{wxToolBar::GetToolPos}\label{wxtoolbargettoolpos}
+
+\constfunc{int}{GetToolPos}{\param{int }{toolId}}
+
+Returns the tool position in the toolbar, or wxNOT\_FOUND if the tool is not found.
+
 \membersection{wxToolBar::GetToolSeparation}\label{wxtoolbargettoolseparation}
 
 \constfunc{int}{GetToolSeparation}{\void}
@@ -685,7 +691,7 @@ and not the eventual size of the tool button.
 
 \membersection{wxToolBar::SetToolClientData}\label{wxtoolbarsettoolclientdata}
 
-\func{void}{GetToolClientData}{\param{wxObject* }{clientData}}
+\func{void}{SetToolClientData}{\param{int }{id}, \param{wxObject* }{clientData}}
 
 Sets the client data associated with the tool.
 
@@ -782,5 +788,3 @@ Only applies to a tool that has been specified as a toggle tool.
 \wxheading{See also}
 
 \helpref{wxToolBar::GetToolState}{wxtoolbargettoolstate}
-
-
