X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dd56228c02bcb9fe27df56e3e95c2791f1b68a86..d83eeece0ee86a3ad81096d894a560647cef0d3a:/docs/latex/wx/scrolbar.tex?ds=sidebyside

diff --git a/docs/latex/wx/scrolbar.tex b/docs/latex/wx/scrolbar.tex
index a9fba5aa2a..955134b7bc 100644
--- a/docs/latex/wx/scrolbar.tex
+++ b/docs/latex/wx/scrolbar.tex
@@ -215,7 +215,7 @@ Sets the position of the scrollbar.
 \func{virtual void}{SetScrollbar}{\param{int }{position},\rtfsp
 \param{int }{thumbSize}, \param{int }{range},\rtfsp
 \param{int }{pageSize},\rtfsp
-\param{const bool }{refresh = TRUE}}
+\param{const bool }{refresh = true}}
 
 Sets the scrollbar properties.
 
@@ -231,7 +231,7 @@ Sets the scrollbar properties.
 the scrollbar will scroll when it is paged up or down. Often it is the same as
 the thumb size.}
 
-\docparam{refresh}{TRUE to redraw the scrollbar, FALSE otherwise.}
+\docparam{refresh}{true to redraw the scrollbar, false otherwise.}
 
 \wxheading{Remarks}
 
