X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dd5504ecd4d27761f554aa4e4ab2897ca2baf531..f0545c140a5eb3db0075571bf9802a2ecbba2ecf:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index 53aacf39e4..c0f217dfd2 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -113,7 +113,7 @@ This function resolves a symbol in a loaded DLL, such as a variable or
 function name.
 
 Returned value will be {\tt NULL} if the symbol was not found in the DLL or if
-an error occured.
+an error occurred.
 
 \wxheading{Parameters}
 
