X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dceb1c097c8c24b398f48b482220c358bc7b4db4..852b6c3ce7baa055da25f5254f6ee2eee0cd79b7:/docs/latex/wx/cmdlpars.tex?ds=inline

diff --git a/docs/latex/wx/cmdlpars.tex b/docs/latex/wx/cmdlpars.tex
index 79209f2a11..35d1ab1178 100644
--- a/docs/latex/wx/cmdlpars.tex
+++ b/docs/latex/wx/cmdlpars.tex
@@ -6,7 +6,7 @@
 %% Created:     27.03.00
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxCmdLineParser}}\label{wxcmdlineparser}
@@ -453,7 +453,7 @@ Add a parameter of the given {\it type} to the command line description.
 
 Parse the command line, return $0$ if ok, $-1$ if {\tt "-h"} or {\tt "--help"} 
 option was encountered and the help message was given or a positive value if a
-syntax error occured.
+syntax error occurred.
 
 \wxheading{Parameters}
 
