X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dceb1c097c8c24b398f48b482220c358bc7b4db4..21dc4be5d27fd73cda55795ab9d1e7e02b494c46:/docs/latex/wx/config.tex?ds=sidebyside

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index 82e3e7938c..d8b57af2b4 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -199,6 +199,7 @@ explicitly.
 Having said all this, enumerating the config entries/groups is very simple:
 
 \begin{verbatim}
+  wxConfigBase *config = ...;
   wxArrayString aNames;
 
   // enumeration variables
@@ -385,6 +386,7 @@ add wxCONFIG\_USE\_NO\_ESCAPE\_CHARACTERS which will turn off character
 escaping for the values of entries stored in the config file: for example 
 a {\it foo} key with some backslash characters will be stored as {\tt foo=C:$\backslash$mydir} instead
 of the usual storage of {\tt foo=C:$\backslash\backslash$mydir}.
+For wxRegConfig, this flag refers to HKLM, and provides read-only access.
 
 The wxCONFIG\_USE\_NO\_ESCAPE\_CHARACTERS style can be helpful if your config 
 file must be read or written to by a non-wxWidgets program (which might not 
