X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dccb75b60dfdca505edf8bb9512979501277c142..a2615ebc22a402b1badb46475f94ab6aa3a64018:/docs/latex/wx/font.tex

diff --git a/docs/latex/wx/font.tex b/docs/latex/wx/font.tex
index 7fa1453b5a..fa8e18494b 100644
--- a/docs/latex/wx/font.tex
+++ b/docs/latex/wx/font.tex
@@ -174,6 +174,13 @@ the application should try to clean up all fonts itself. This is because
 wxWindows cannot know if a pointer to the font object is stored in an
 application data structure, and there is a risk of double deletion.
 
+\membersection{wxFont::IsFixedWidth}\label{wxfontisfixedwidth}
+
+\constfunc{bool}{IsFixedWidth}{\void}
+
+Returns {\tt TRUE} if the font is a fixed width (or monospaced) font, 
+{\tt FALSE} if it is a proportional one or font is invalid.
+
 \membersection{wxFont::GetDefaultEncoding}\label{wxfontgetdefaultencoding}
 
 \func{static wxFontEncoding}{GetDefaultEncoding}{\void}
@@ -260,6 +267,12 @@ weight identifiers.
 
 \helpref{wxFont::SetWeight}{wxfontsetweight}
 
+\membersection{wxFont::Ok}\label{wxfontok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns {\tt TRUE} if this object is a valid font, {\tt FALSE} otherwise.
+
 \membersection{wxFont::SetDefaultEncoding}\label{wxfontsetdefaultencoding}
 
 \func{static void}{SetDefaultEncoding}{\param{wxFontEncoding }{encoding}}
