X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dcbd177f06597f98aae27bf53a4c98b4739102c7..78603ad208c39cfd20b9e39fb760851148120407:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index df109182d8..448c359565 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -215,7 +215,9 @@ Returns the pointer to the active log target (may be NULL).
 \func{static wxLog *}{SetActiveTarget}{\param{wxLog * }{ logtarget}}
 
 Sets the specified log target as the active one. Returns the pointer to the
-previous active log target (may be NULL).
+previous active log target (may be NULL).  To supress logging use a new
+instance of wxLogNull not NULL.  If the active log target is set to NULL a
+new default log target will be created when logging occurs.
 
 \membersection{wxLog::Suspend}\label{wxlogsuspend}
 
