X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dcbd177f06597f98aae27bf53a4c98b4739102c7..32485259c1342115488d219776dfebeb3d4d81b1:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 49dab77982..4039407671 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -28,12 +28,24 @@ Initializes a new read-only memory stream which will use the specified buffer
 {\it data} of length {\it len}. The stream does not take ownership of the 
 buffer, i.e. that it will not delete in its destructor.
 
+\func{}{wxMemoryInputStream}{\param{const wxMemoryOutputStream&}{ stream}}
+
+Creates a new read-only memory stream, initilalizing it with the
+data from the given output stream \arg{stream}.
+
 \membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}\label{wxmemoryinputstreamdtor}
 
 \func{}{\destruct{wxMemoryInputStream}}{\void}
 
 Destructor.
 
+\membersection{wxMemoryInputStream::GetInputStreamBuffer}\label{wxmemoryinputstreamgetistrmbuf}
+
+\constfunc{wxStreamBuffer *}{GetInputStreamBuffer}{\void}
+
+Returns the pointer to the stream object used as an internal buffer
+for that stream.
+
 % -----------------------------------------------------------------------------
 % wxMemoryOutputStream
 % -----------------------------------------------------------------------------
@@ -87,3 +99,10 @@ the buffer.
 CopyTo returns the number of bytes copied to the buffer. Generally it is either
 len or the size of the stream buffer.
 
+\membersection{wxMemoryOutputStream::GetOutputStreamBuffer}\label{wxmemoryoutputstreamgetostrmbuf}
+
+\constfunc{wxStreamBuffer *}{GetOutputStreamBuffer}{\void}
+
+Returns the pointer to the stream object used as an internal buffer
+for that stream.
+
