X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dc99a350df1faec271e78390f50a963a81284e92..fc715b5088d317ad09cad84f0d9d375bfac055fd:/docs/latex/wx/window.tex?ds=sidebyside

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 5d8c3490f4..eab626d510 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -70,7 +70,7 @@ Tab and Shift-Tab.}
 the window completely when its size is changed. Since this behaviour is now the default, the style is now obsolete
 and no longer has an effect.}
 \twocolitem{\windowstyle{wxVSCROLL}}{Use this style to enable a vertical
-scrollbar. Notice that this style should cannot be used with native controls
+scrollbar. Notice that this style cannot be used with native controls
 which don't support scrollbars nor with top-level windows in most ports.}
 \twocolitem{\windowstyle{wxHSCROLL}}{Use this style to enable a horizontal
 scrollbar. The same limitations as for wxVSCROLL apply to this style.}
