X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dc99a350df1faec271e78390f50a963a81284e92..de34bb081b6ce19bd4b1216d26a79b817a631bbd:/docs/latex/wx/window.tex

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 5d8c3490f4..b4952b1f66 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -41,6 +41,10 @@ changes the behaviour of the latter.
 
 <wx/window.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 The following styles can apply to all windows, although they will not always make sense for a particular
@@ -70,7 +74,7 @@ Tab and Shift-Tab.}
 the window completely when its size is changed. Since this behaviour is now the default, the style is now obsolete
 and no longer has an effect.}
 \twocolitem{\windowstyle{wxVSCROLL}}{Use this style to enable a vertical
-scrollbar. Notice that this style should cannot be used with native controls
+scrollbar. Notice that this style cannot be used with native controls
 which don't support scrollbars nor with top-level windows in most ports.}
 \twocolitem{\windowstyle{wxHSCROLL}}{Use this style to enable a horizontal
 scrollbar. The same limitations as for wxVSCROLL apply to this style.}
