X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dbdb39b2d0b8c3359eab1693fd1fc786499f62d7..b2edef6f2f587d957eabbc17364382293707340f:/docs/latex/wx/view.tex?ds=sidebyside

diff --git a/docs/latex/wx/view.tex b/docs/latex/wx/view.tex
index e977bd41df..77b0811952 100644
--- a/docs/latex/wx/view.tex
+++ b/docs/latex/wx/view.tex
@@ -130,12 +130,14 @@ frame associated with the view.
 
 \func{virtual bool}{OnCreate}{\param{wxDocument* }{doc}, \param{long}{ flags}}
 
-Called just after view construction to give the view a chance to initialize
-itself based on the passed document and flags (unused). By default, simply
-returns TRUE. If the function returns FALSE, the view will be deleted.
-
-The predefined document child frame, wxDocChildFrame, calls this function
-automatically.
+wxDocManager or wxDocument creates a wxView via a wxDocTemplate.
+Just after the wxDocTemplate creates the wxView, it calls
+wxView::OnCreate. In its OnCreate member function, the wxView can create a wxDocChildFrame
+or a derived class. This wxDocChildFrame provides user interface
+elements to view and/or edit the contents of the wxDocument.
+
+By default, simply returns TRUE. If the function returns FALSE, the
+view will be deleted.
 
 \membersection{wxView::OnCreatePrintout}
 
