X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dbd94b75015561fe527069c138ce43c44797fe35..fc715b5088d317ad09cad84f0d9d375bfac055fd:/docs/latex/wx/strtotxt.tex?ds=inline

diff --git a/docs/latex/wx/strtotxt.tex b/docs/latex/wx/strtotxt.tex
index eb84cf91cb..08219a2dda 100644
--- a/docs/latex/wx/strtotxt.tex
+++ b/docs/latex/wx/strtotxt.tex
@@ -6,7 +6,7 @@
 %% Created:     19.10.01
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 2001 Vadim Zeitlin <vadim@wxwindows.org>
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxStreamToTextRedirector}}\label{wxstreamtotextredirector}
@@ -62,7 +62,7 @@ the default parameter value to the text control {\it text}.
 
 \wxheading{Parameters}
 
-\docparam{text}{The text control to append output too, must be non NULL}
+\docparam{text}{The text control to append output too, must be non-NULL}
 
 \docparam{ostr}{The C++ stream to redirect, {\it cout} is used if it is NULL}
 
