X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/dbd94b75015561fe527069c138ce43c44797fe35..c2651b0a5c407ceb1693a865ee19d3d57e147c97:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index c48821a94f..a0bd5a64d1 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -226,19 +226,19 @@ The created IO buffer is growable by the object.
 
 \membersection{wxStreamBuffer::GetBufferStart}\label{wxstreambuffergetbufferstart}
 
-\constfunc{char *}{GetBufferStart}{\void}
+\constfunc{void *}{GetBufferStart}{\void}
 
 Returns a pointer on the start of the stream buffer.
 
 \membersection{wxStreamBuffer::GetBufferEnd}\label{wxstreambuffergetbufferend}
 
-\constfunc{char *}{GetBufferEnd}{\void}
+\constfunc{void *}{GetBufferEnd}{\void}
 
 Returns a pointer on the end of the stream buffer.
 
 \membersection{wxStreamBuffer::GetBufferPos}\label{wxstreambuffergetbufferpos}
 
-\constfunc{char *}{GetBufferPos}{\void}
+\constfunc{void *}{GetBufferPos}{\void}
 
 Returns a pointer on the current position of the stream buffer.
 
