X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/da97b2609e01d9cc2ea50a697c959d7431ddd427..9bc9312015a0d1e25e89df54225781c8fb713b77:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index 0c601ff5df..cd945711a4 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -42,7 +42,7 @@ used.}
 a window. You can also use the symbol wxMAC\_WINDOW\_PLAIN\_TRANSITION.}
 \twocolitem{window-default-variant}{The default variant used by windows (cast to integer from the wxWindowVariant enum).
 Also known as wxWINDOW\_DEFAULT\_VARIANT.}
-\twocolitem{mac.listctrl.always_use_generic}{Tells wxListCtrl to use the generic 
+\twocolitem{mac.listctrl.always\_use\_generic}{Tells wxListCtrl to use the generic 
 control even when it is capable of using the native control instead. 
 Also knwon as wxMAC\_ALWAYS\_USE\_GENERIC\_LISTCTRL.}
 \end{twocollist}
