X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/da97b2609e01d9cc2ea50a697c959d7431ddd427..305c49a1a93b6c0b6092f0fe1eb855fdd31c2618:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index 0c601ff5df..12b8b11bf8 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -33,6 +33,19 @@ Setting this to 0 causes more flicker, but allows applications to paint graphics
 used.}
 \end{twocollist}
 
+\wxheading{GTK}
+
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf Option}}{{\bf Value}}
+\twocolitem{gtk.tlw.can-set-transparent}{\helpref{wxTopLevelWindow::CanSetTransparent()}{wxtoplevelwindowcansettransparent} 
+method normally tries to detect automatically whether transparency for top
+level windows is currently supported, however this may sometimes fail and this
+option allows to override the automatic detection. Setting it to $1$ makes the
+transparency be always available (setting it can still fail, of course) and
+setting it to $0$ makes it always unavailable.}
+\end{twocollist}
+
 \wxheading{Mac}
 
 \twocolwidtha{7cm}
@@ -42,7 +55,7 @@ used.}
 a window. You can also use the symbol wxMAC\_WINDOW\_PLAIN\_TRANSITION.}
 \twocolitem{window-default-variant}{The default variant used by windows (cast to integer from the wxWindowVariant enum).
 Also known as wxWINDOW\_DEFAULT\_VARIANT.}
-\twocolitem{mac.listctrl.always_use_generic}{Tells wxListCtrl to use the generic 
+\twocolitem{mac.listctrl.always\_use\_generic}{Tells wxListCtrl to use the generic 
 control even when it is capable of using the native control instead. 
 Also knwon as wxMAC\_ALWAYS\_USE\_GENERIC\_LISTCTRL.}
 \end{twocollist}
