X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d95527de9ac48fa54207ebf698286f92e909faaf..1e9693318372b3321c400fc7a1746bbcd696eceb:/docs/latex/wx/sizer.tex

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index a90b83bffd..a04d36f72b 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -241,6 +241,8 @@ windows which manage it.
 
 \membersection{wxSizer::GetChildren}\label{wxsizergetchildren}
 
+\constfunc{const wxSizerItemList\&}{GetChildren}{\void}
+
 \func{wxSizerItemList\&}{GetChildren}{\void}
 
 Returns the list of the items in this sizer. The elements of type-safe 
@@ -596,8 +598,10 @@ Note that if this method is not called, the wxSizerFlags has no specified alignm
 
 \wxheading{See also}
 
+\helpref{Top}{wxsizerflagstop},\\
 \helpref{Left}{wxsizerflagsleft},\\
 \helpref{Right}{wxsizerflagsright},\\
+\helpref{Bottom}{wxsizerflagsbottom},\\
 \helpref{Centre}{wxsizerflagscentre}
 
 
@@ -615,6 +619,17 @@ default size, as returned by \helpref{GetDefaultBorder}{wxsizerflagsgetdefaultbo
 is used.
 
 
+\membersection{wxSizerFlags::Bottom}\label{wxsizerflagsbottom}
+
+\func{wxSizerFlags\& }{Bottom}{\void}
+
+Aligns the object to the bottom, shortcut for \texttt{Align(wxALIGN\_BOTTOM)}
+
+\wxheading{See also}
+
+\helpref{Align}{wxsizerflagsalign}
+
+
 \membersection{wxSizerFlags::Center}\label{wxsizerflagscenter}
 
 \func{wxSizerFlags\& }{Center}{\void}
@@ -704,6 +719,17 @@ Set the \texttt{wx\_SHAPED} flag which indicates that the elements should
 always keep the fixed width to height ratio equal to its original value.
 
 
+\membersection{wxSizerFlags::Top}\label{wxsizerflagstop}
+
+\func{wxSizerFlags\& }{Top}{\void}
+
+Aligns the object to the top, shortcut for \texttt{Align(wxALIGN\_TOP)}
+
+\wxheading{See also}
+
+\helpref{Align}{wxsizerflagsalign}
+
+
 \membersection{wxSizerFlags::TripleBorder}\label{wxsizerflagstriplebleborder}
 
 \func{wxSizerFlags\& }{TripleBorder}{\param{int }{direction = wxALL}}
