X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d7eee191c55687785a2be927fd387d10514cdf1b..0e300ddd7d91d46e3d9fcbbefe916b0fda6fcbbc:/docs/latex/wx/text.tex

diff --git a/docs/latex/wx/text.tex b/docs/latex/wx/text.tex
index a9c2117f2d..724f33a98c 100644
--- a/docs/latex/wx/text.tex
+++ b/docs/latex/wx/text.tex
@@ -83,6 +83,11 @@ when the text controls contents changes - whether this is due to user input or
 comes from the program itself (for example, if SetValue() is called)}
 \twocolitem{{\bf EVT\_TEXT\_ENTER(id, func)}}{Respond to a wxEVT\_COMMAND\_TEXT\_ENTER event,
 generated when enter is pressed in a single-line text control.}
+\twocolitem{{\bf EVT\_TEXT\_URL(id, func)}}{A mouse event occured over an URL
+in the text control (Win32 only)}
+\twocolitem{{\bf EVT\_TEXT\_MAXLEN(id, func)}}{User tried to enter more text
+into the control than the limit set by 
+\helpref{SetMaxLength}{wxtextctrlsetmaxlength}.}
 \end{twocollist}%
 
 %\wxheading{See also}
@@ -522,6 +527,10 @@ This function sets the maximum number of characters the user can enter into the
 control. In other words, it allows to limit the text value length to {\it len}
 not counting the terminating {\tt NUL} character.
 
+If {\it len} is $0$, the previously set max length limi, if any, is discarded
+and the user may enter as much text as the underlying native text control
+widget supports (typically at least 32Kb).
+
 If the user tries to enter more characters into the text control when it
 already is filled up to the maximal length, a 
 {\tt wxEVT\_COMMAND\_TEXT\_MAXLEN} event is sent to notify the program about it
@@ -534,8 +543,6 @@ Note that this function may only be used with single line text controls.
 
 Only implemented in wxMSW/wxGTK starting with wxWindows 2.3.2.
 
-The {\tt wxEVT\_COMMAND\_TEXT\_MAXLEN} event is only sent by wxMSW.
-
 \membersection{wxTextCtrl::SetSelection}\label{wxtextctrlsetselection}
 
 \func{virtual void}{SetSelection}{\param{long}{ from}, \param{long}{ to}}
