X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d7da975624b24ca0b243e9e70974ecaf9047c50a..4c7852186d48a5b8f406462c2c3fa020f0a052bb:/docs/latex/wx/wnddisbl.tex?ds=sidebyside

diff --git a/docs/latex/wx/wnddisbl.tex b/docs/latex/wx/wnddisbl.tex
index 43a92d3da7..798dae3dd7 100644
--- a/docs/latex/wx/wnddisbl.tex
+++ b/docs/latex/wx/wnddisbl.tex
@@ -6,7 +6,7 @@
 %% Created:     03.03.00
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% Licence:     wxWindows licence
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxWindowDisabler}}\label{wxwindowdisabler}
@@ -40,3 +40,4 @@ Disables all top level windows of the applications with the exception of
 \membersection{wxWindowDisabler::\destruct{wxWindowDisabler}}
 
 Reenables back the windows disabled by the constructor.
+
