X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d7cb14cec900098b866f58804e5f6e899cb158ea..b782f2e0f6abc7baa9a8bfc158847a89d5d12145:/docs/latex/wx/tipprov.tex

diff --git a/docs/latex/wx/tipprov.tex b/docs/latex/wx/tipprov.tex
index a651e5b853..c824373aab 100644
--- a/docs/latex/wx/tipprov.tex
+++ b/docs/latex/wx/tipprov.tex
@@ -49,3 +49,4 @@ The program usually remembers the value returned by this function after calling
 \helpref{wxShowTip}{wxshowtip}. Note that it is not the same as the value which
 was passed to wxShowTip $+ 1$ because the user might have pressed the "Next"
 button in the tip dialog.
+
