X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d77836e48cf1a0f7575cd1ce66f59f5bc07e5b56..402dfce7b324c977a5b396b07cd36835d5514e52:/docs/latex/wx/vscroll.tex

diff --git a/docs/latex/wx/vscroll.tex b/docs/latex/wx/vscroll.tex
index 95892a7a01..b965f1fd15 100644
--- a/docs/latex/wx/vscroll.tex
+++ b/docs/latex/wx/vscroll.tex
@@ -186,7 +186,7 @@ Returns {\tt true} if the given line is (at least partially) visible or
 
 \membersection{wxVScrolledWindow::OnGetLineHeight}\label{wxvscrolledwindowongetlineheight}
 
-\constfunc{wxCoord}{OnGetLineHeight}{\param{size\_t }{n}}
+\constfunc{virtual wxCoord}{OnGetLineHeight}{\param{size\_t }{n}}
 
 This protected virtual function must be overridden in the derived class and it
 should return the height of the given line in pixels.
@@ -198,7 +198,7 @@ should return the height of the given line in pixels.
 
 \membersection{wxVScrolledWindow::OnGetLinesHint}\label{wxvscrolledwindowongetlineshint}
 
-\constfunc{void}{OnGetLinesHint}{\param{size\_t }{lineMin}, \param{size\_t }{lineMax}}
+\constfunc{virtual void}{OnGetLinesHint}{\param{size\_t }{lineMin}, \param{size\_t }{lineMax}}
 
 This function doesn't have to be overridden but it may be useful to do
 it if calculating the lines heights is a relatively expensive operation
