X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d75c7970c4f530d2ea681ca3f92c97eb3b7bc251..bf7945cef10c0844a32e95695c544d829da9293a:/docs/latex/wx/size.tex

diff --git a/docs/latex/wx/size.tex b/docs/latex/wx/size.tex
index fdf4493367..a29fc06484 100644
--- a/docs/latex/wx/size.tex
+++ b/docs/latex/wx/size.tex
@@ -7,8 +7,8 @@ wxSize is used throughout wxWindows as well as wxPoint which, although almost
 equivalent to wxSize, has a different meaning: wxPoint represents a position
 while wxSize - the size.
 
-\pythonnote{wxPython defines aliases for the \tt{x} and \tt{y} members
-named \tt{width} and \tt{height} since it makes much more sense for
+\pythonnote{wxPython defines aliases for the {\tt x} and {\tt y} members
+named {\tt width} and {\tt height} since it makes much more sense for
 sizes.
 }
 
