X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d6adfdf93495b0e569c30431cb51f296126d4e37..ab9717339232a7a728dea666c59b73fd6ac78dd3:/docs/latex/wx/stattext.tex

diff --git a/docs/latex/wx/stattext.tex b/docs/latex/wx/stattext.tex
index efb0031f79..00be03aa2c 100644
--- a/docs/latex/wx/stattext.tex
+++ b/docs/latex/wx/stattext.tex
@@ -13,6 +13,10 @@ A static text control displays one or more lines of read-only text.
 
 <wx/stattext.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -102,12 +106,15 @@ label text is needed.
 
 \membersection{wxStaticText::GetLabelText}\label{wxstatictextgetlabeltext}
 
-\constfunc{const wxString\&}{GetLabelText}{\void}
+\constfunc{wxString}{GetLabelText}{\void}
+
+\func{static wxString}{GetLabelText}{\param{const wxString\& }{label}}
 
-Returns the control's label or the given \arg{label} string for the static
-version without the mnemonics characters (if any) and without the markup
-(if the control has \texttt{wxST\_MARKUP} style).
+The first form returns the control's label without the mnemonics characters (if any) 
+and without the markup (if the control has \texttt{wxST\_MARKUP} style).
 
+The second (static) version returns the given \arg{label} string without the mnemonics 
+characters (if any) and without the markup.
 
 
 \membersection{wxStaticText::SetLabel}\label{wxstatictextsetlabel}
