X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d4fbfbe5cb7ce7ce651437d10222d5c2deeccb24..ebdb3bc7e06d54e06c8415f10277a093a4a1e4df:/docs/latex/wx/text.tex

diff --git a/docs/latex/wx/text.tex b/docs/latex/wx/text.tex
index 768331d5fc..b19864deb8 100644
--- a/docs/latex/wx/text.tex
+++ b/docs/latex/wx/text.tex
@@ -1005,7 +1005,9 @@ after the call to SetValue).
 Note that this function will \emph{not} generate the {\tt wxEVT\_COMMAND\_TEXT\_UPDATED} 
 event.
 This is the only difference with \helpref{SetValue}{wxtextctrlsetvalue}.
-See \helpref{this topic}{progevent} for more info.
+See \helpref{this topic}{progevent} for more information.
+
+\newsince{2.7.1}
 
 \wxheading{Parameters}
 
