X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d4c92f55d47421a2125b6e1863195b21fa9325f2..b41f29c357205531670a156b67247b9345688150:/docs/latex/wx/arrstrng.tex?ds=sidebyside

diff --git a/docs/latex/wx/arrstrng.tex b/docs/latex/wx/arrstrng.tex
index 70ec048f43..e79a8fcdd2 100644
--- a/docs/latex/wx/arrstrng.tex
+++ b/docs/latex/wx/arrstrng.tex
@@ -48,7 +48,7 @@ functions.
 
 \wxheading{Include files}
 
-<wx/string.h>
+<wx/arrstr.h>
 
 \wxheading{See also}
 
