X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d3f3e8575aa8829231b86ff15ff587e9cc6df3f8..395a82b13fa5f316d2d0dead17701e9bc23337d3:/docs/latex/wx/dataobj.tex?ds=inline

diff --git a/docs/latex/wx/dataobj.tex b/docs/latex/wx/dataobj.tex
index 3366463cbf..066447ba1b 100644
--- a/docs/latex/wx/dataobj.tex
+++ b/docs/latex/wx/dataobj.tex
@@ -167,7 +167,7 @@ in list context it returns a list containing all the supported formats.}
 \constfunc{virtual bool}{GetDataHere}{\param{const wxDataFormat\&}{ format}, \param{void }{*buf} }
 
 The method will write the data of the format {\it format} in the buffer {\it
-buf} and return TRUE on success, FALSE on failure.
+buf} and return true on success, false on failure.
 
 \membersection{wxDataObject::GetDataSize}\label{wxdataobjectgetdatasize}
 
@@ -196,5 +196,5 @@ native format of the wxDataObject.
 Set the data in the format {\it format} of the length {\it len} provided in the
 buffer {\it buf}.
 
-Returns TRUE on success, FALSE on failure.
+Returns true on success, false on failure.
 
