X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d2c2afc91be4bdb6e036516785f334ddb54afa0c..e477b168c69744ffb52d931045e4b237c435c313:/docs/latex/wx/mcaptevt.tex

diff --git a/docs/latex/wx/mcaptevt.tex b/docs/latex/wx/mcaptevt.tex
index c493cbbe41..91bc6dcbe1 100644
--- a/docs/latex/wx/mcaptevt.tex
+++ b/docs/latex/wx/mcaptevt.tex
@@ -46,5 +46,5 @@ Constructor.
 
 \constfunc{wxWindow*}{GetCapturedWindow}{\void}
 
-Returns the window that gained the capture, or NULL if it was a non-wxWindows window.
+Returns the window that gained the capture, or NULL if it was a non-wxWidgets window.
 
