X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d2c2afc91be4bdb6e036516785f334ddb54afa0c..b19d7524fc5787218b54cc28dc23bf319e413b4a:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index 9af8616778..545b103690 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -969,7 +969,7 @@ directory doesn't exist).
 
 \wxheading{Portability}
 
-This function is implemented for Win16 (only for drives less than 2Gb), Win32,
+This function is implemented for Win32,
 Mac OS and generic Unix provided the system has {\tt statfs()} function.
 
 This function first appeared in wxWindows 2.3.2.
