X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d2c2afc91be4bdb6e036516785f334ddb54afa0c..8f9643924b9ed5aa35a1b560a37c7985db42d225:/docs/latex/wx/timer.tex

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index fc15f167a7..dd845dc16c 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -4,13 +4,13 @@ The wxTimer class allows you to execute code at specified intervals. Its
 precision is platform-dependent, but in general will not be better than 1ms nor
 worse than 1s.
 
-There are two different ways to use this class:
+There are three different ways to use this class:
 
 \begin{enumerate}
 \item You may derive a new class from wxTimer and override the 
 \helpref{Notify}{wxtimernotify} member to perform the required action.
 \item Or you may redirect the notifications to any 
-\helpref{wxEvtHandler}{wxevthandler} derived object by using the non default
+\helpref{wxEvtHandler}{wxevthandler} derived object by using the non-default
 constructor or \helpref{SetOwner}{wxtimersetowner}. Then use the {\tt EVT\_TIMER} 
 macro to connect it to the event handler which will receive 
 \helpref{wxTimerEvent}{wxtimerevent} notifications.
@@ -24,7 +24,7 @@ In any case, you must start the timer with \helpref{Start}{wxtimerstart}
 after constructing it before it actually starts sending notifications. It can
 be stopped later with \helpref{Stop}{wxtimerstop}.
 
-{\bf NB:} note that timer can only be used from the main thread currently.
+{\bf Note:} A timer can only be used from the main thread.
 
 \wxheading{Derived from}
 
@@ -53,7 +53,7 @@ Default constructor. If you use it to construct the object and don't call
 Creates a timer and associates it with {\it owner}. Please see 
 \helpref{SetOwner}{wxtimersetowner} for the description of parameters.
 
-\membersection{wxTimer::\destruct{wxTimer}}
+\membersection{wxTimer::\destruct{wxTimer}}\label{wxtimerdtor}
 
 \func{}{\destruct{wxTimer}}{\void}
 
@@ -97,7 +97,7 @@ id equal to {\it id}\/ specified here.
 
 \membersection{wxTimer::Start}\label{wxtimerstart}
 
-\func{bool}{Start}{\param{int}{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
+\func{bool}{Start}{\param{int }{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
 
 (Re)starts the timer. If {\it milliseconds}\/ parameter is -1 (value by default),
 the previous value is used. Returns {\tt false} if the timer could not be started,
@@ -157,6 +157,10 @@ void MyFrame::OnTimer(wxTimerEvent& event)
 
 \end{verbatim}
 
+\wxheading{Derived from}
+
+\helpref{wxEvent}{wxevent}
+
 \wxheading{Include files}
 
 <wx/timer.h>
