X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d2c2afc91be4bdb6e036516785f334ddb54afa0c..6294ac2e91af3408cfa04910b90ad7ace94f1220:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index f72f9ea765..61accb8f3d 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -6,7 +6,7 @@
 %% Created:     14.01.02 (extracted from dllload.tex)
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDynamicLibrary}}\label{wxdynamiclibrary}
@@ -56,7 +56,7 @@ The possible values for \arg{cat} are:
 \func{wxString}{CanonicalizePluginName}{\param{const wxString\& }{name}, \param{wxPluginCategory}{ cat = wxDL\_PLUGIN\_GUI}}
 
 This function does the same thing as 
-\helpref{CanonicalizeName}{wxdynamiclibrarycanonicalizename} but for wxWindows
+\helpref{CanonicalizeName}{wxdynamiclibrarycanonicalizename} but for wxWidgets
 plugins. The only difference is that compiler and version information are added
 to the name to ensure that the plugin which is going to be loaded will be
 compatible with the main program.
