X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d2c2afc91be4bdb6e036516785f334ddb54afa0c..593177c566d3471189571641fb9db8efa27ed551:/docs/latex/wx/wizpage.tex

diff --git a/docs/latex/wx/wizpage.tex b/docs/latex/wx/wizpage.tex
index 731ed4b371..3e4ddf1b0d 100644
--- a/docs/latex/wx/wizpage.tex
+++ b/docs/latex/wx/wizpage.tex
@@ -50,7 +50,7 @@ should be very rarely needed.
 
 \membersection{wxWizardPage::wxWizardPage}\label{wxwizardpagewxwizardpage}
 
-\func{}{wxWizardPage}{\param{wxWizard* }{parent}, \param{const wxBitmap\& }{bitmap = wxNullBitmap}, \param{const wxChar }{*resource = NULL}}
+\func{}{wxWizardPage}{\param{wxWizard* }{parent}, \param{const wxBitmap\& }{bitmap = wxNullBitmap}}
 
 Constructor accepts an optional bitmap which will be used for this page
 instead of the default one for this wizard (note that all bitmaps used should
@@ -63,7 +63,6 @@ wizard will resize and reposition the page anyhow.
 
 \docparam{bitmap}{The page-specific bitmap if different from the global one}
 
-\docparam{resource}{Load the page from the specified resource if non NULL}
 
 \membersection{wxWizardPage::GetPrev}\label{wxwizardpagegetprev}
 
@@ -139,7 +138,7 @@ instead.
 \membersection{wxWizardPageSimple::wxWizardPageSimple}\label{wxwizardpagesimplewxwizardpagesimple}
 
 \func{}{wxWizardPageSimple}{\param{wxWizard* }{parent = NULL}, \param{wxWizardPage* }{prev = NULL}, \param{wxWizardPage* }{next = NULL}, 
-\param{const wxBitmap& }{bitmap = wxNullBitmap}}
+\param{const wxBitmap\& }{bitmap = wxNullBitmap}}
 
 Constructor takes the previous and next pages. They may be modified later by
 \helpref{SetPrev()}{wxwizardpagesimplesetprev} or 
