X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d2c2afc91be4bdb6e036516785f334ddb54afa0c..01b8292d114793e679b05676cbb8c352e9e95c1c:/docs/latex/wx/timer.tex?ds=inline

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index fc15f167a7..d5554cd07c 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -53,7 +53,7 @@ Default constructor. If you use it to construct the object and don't call
 Creates a timer and associates it with {\it owner}. Please see 
 \helpref{SetOwner}{wxtimersetowner} for the description of parameters.
 
-\membersection{wxTimer::\destruct{wxTimer}}
+\membersection{wxTimer::\destruct{wxTimer}}\label{wxtimerdtor}
 
 \func{}{\destruct{wxTimer}}{\void}
 
@@ -97,7 +97,7 @@ id equal to {\it id}\/ specified here.
 
 \membersection{wxTimer::Start}\label{wxtimerstart}
 
-\func{bool}{Start}{\param{int}{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
+\func{bool}{Start}{\param{int }{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
 
 (Re)starts the timer. If {\it milliseconds}\/ parameter is -1 (value by default),
 the previous value is used. Returns {\tt false} if the timer could not be started,
