X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d1f1e77a91f3d7e60470e50dc941fce6b813d11d..e5251d4f78176837e2eb857fae246435207ccaf2:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 777b676478..70754447b3 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -231,7 +231,7 @@ Sets the number of fields, and optionally the field widths.
 \pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
 to set the widths of the fields.}
 
-\perlnote{In wxPerl this function acceps only the {\tt n} parameter.
+\perlnote{In wxPerl this function accepts only the {\tt n} parameter.
 Use SetStatusWidths to set the field widths.}
 
 \wxheading{Parameters}
