X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d17f05afeb41c64fab410cd3178a78596da55e38..40717c90bf265de0a752d637a35cd88cb22bbd05:/docs/latex/wx/htcell.tex

diff --git a/docs/latex/wx/htcell.tex b/docs/latex/wx/htcell.tex
index e585ffa682..71ade362ee 100644
--- a/docs/latex/wx/htcell.tex
+++ b/docs/latex/wx/htcell.tex
@@ -1,7 +1,13 @@
-%
-% automatically generated by HelpGen from
-% htmlcell.tex at 21/Mar/99 22:45:23
-%
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
+%% Name:        htcell.tex
+%% Purpose:     wxHtmlCell documentation
+%% Author:      wxWidgets Team
+%% Modified by:
+%% Created:     21/Mar/99 22:45:23
+%% RCS-ID:      $Id$
+%% Copyright:   (c) wxWidgets Team
+%% License:     wxWindows license
+%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxHtmlCell}}\label{wxhtmlcell}
 
@@ -16,7 +22,11 @@ perform special actions such as color or font change.
 
 \wxheading{Derived from}
 
-wxObject
+\helpref{wxObject}{wxobject}
+
+\wxheading{Include files}
+
+<wx/html/htmlcell.h>
 
 \wxheading{See Also}
 
@@ -41,7 +51,7 @@ should not be crossed by words, images etc.). If this cell cannot be divided
 into two pieces (each one on another page) then it moves the pagebreak
 few pixels up.
 
-Returns TRUE if pagebreak was modified, FALSE otherwise
+Returns true if pagebreak was modified, false otherwise
 
 Usage: 
 \begin{verbatim}
@@ -123,12 +133,30 @@ Returns descent value of the cell (m\_Descent member).
 \image{}{descent.bmp}
 }
 
+\membersection{wxHtmlCell::GetFirstChild}\label{wxhtmlcellgetfirstchild}
+
+\func{wxHtmlCell*}{GetFirstChild}{\void}
+
+Returns pointer to the first cell in the list.
+You can then use child's \helpref{GetNext}{wxhtmlcellgetnext}
+method to obtain pointer to the next cell in list.
+
+{\bf Note:} This shouldn't be used by the end user. If you need some way of
+finding particular cell in the list, try \helpref{Find}{wxhtmlcellfind} method
+instead.
+
 \membersection{wxHtmlCell::GetHeight}\label{wxhtmlcellgetheight}
 
 \constfunc{int}{GetHeight}{\void}
 
 Returns height of the cell (m\_Height member).
 
+\membersection{wxHtmlCell::GetId}\label{wxhtmlcellgetid}
+
+\constfunc{virtual wxString}{GetId}{\void}
+
+Returns unique cell identifier if there is any, empty string otherwise.
+
 \membersection{wxHtmlCell::GetLink}\label{wxhtmlcellgetlink}
 
 \constfunc{virtual wxHtmlLinkInfo*}{GetLink}{\param{int }{x = 0}, \param{int }{y = 0}}
@@ -182,10 +210,10 @@ Returns width of the cell (m\_Width member).
 
 \func{virtual void}{Layout}{\param{int }{w}}
 
-This method performs 2 actions:
+This method performs two actions:
 
 \begin{enumerate}\itemsep=0pt
-\item adjusts cell's width according to the fact that maximal possible width is {\it w}.
+\item adjusts the cell's width according to the fact that maximal possible width is {\it w}.
 (this has sense when working with horizontal lines, tables etc.)
 \item prepares layout (=fill-in m\_PosX, m\_PosY (and sometimes m\_Height) members)
 based on actual width {\it w}
@@ -199,7 +227,7 @@ before calling Layout.
 
 \func{virtual void}{OnMouseClick}{\param{wxWindow* }{parent}, \param{int}{x}, \param{int }{y}, \param{const wxMouseEvent\& }{event}}
 
-This function is simple event handler. Each time user clicks mouse button over a cell
+This function is simple event handler. Each time the user clicks mouse button over a cell
 within \helpref{wxHtmlWindow}{wxhtmlwindow} this method of that cell is called. Default behavior is
 that it calls \helpref{wxHtmlWindow::LoadPage}{wxhtmlwindowloadpage}.
 
@@ -214,14 +242,20 @@ you should use wxHtmlBinderCell instead.
 
 \docparam{x, y}{coordinates of mouse click (this is relative to cell's origin}
 
-\docparam{left, middle, right}{boolean flags for mouse buttons. TRUE if the left/middle/right
-button is pressed, FALSE otherwise}
+\docparam{left, middle, right}{boolean flags for mouse buttons. true if the left/middle/right
+button is pressed, false otherwise}
+
+\membersection{wxHtmlCell::SetId}\label{wxhtmlcellsetid}
+
+\func{void}{SetId}{\param{const wxString\& }{id}}
+
+Sets unique cell identifier. Default value is no identifier, i.e. empty string.
 
 \membersection{wxHtmlCell::SetLink}\label{wxhtmlcellsetlink}
 
 \func{void}{SetLink}{\param{const wxHtmlLinkInfo\& }{link}}
 
-Sets the hypertext link asocciated with this cell. (Default value
+Sets the hypertext link associated with this cell. (Default value
 is \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}("", "") (no link))
 
 \membersection{wxHtmlCell::SetNext}\label{wxhtmlcellsetnext}
@@ -229,7 +263,7 @@ is \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}("", "") (no link))
 \func{void}{SetNext}{\param{wxHtmlCell }{*cell}}
 
 Sets the next cell in the list. This shouldn't be called by user - it is
-to be used only by \helpref{wxHtmlContainerCell::InsertCell}{wxhtmlcontainercellinsertcell}
+to be used only by \helpref{wxHtmlContainerCell::InsertCell}{wxhtmlcontainercellinsertcell}.
 
 \membersection{wxHtmlCell::SetParent}\label{wxhtmlcellsetparent}
 
