X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d13d8d4e5f03c0f54af4589bc285fd3e4af48b3b..a9249b2eb2a40d8c71f828669045c4ddaa8dc5ff:/docs/latex/wx/sizer.tex

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index 07173e7725..25494f5789 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -1,8 +1,11 @@
 \section{\class{wxSizer}}\label{wxsizer}
 
 wxSizer is the abstract base class used for laying out subwindows in a window. You
-cannot use wxSizer directly; instead, you will have to use \helpref{wxBoxSizer}{wxboxsizer}, 
-\helpref{wxStaticBoxSizer}{wxstaticboxsizer} or \helpref{wxNotebookSizer}{wxnotebooksizer}.
+cannot use wxSizer directly; instead, you will have to use one of the sizer
+classes derived from it. Currently there are \helpref{wxBoxSizer}{wxboxsizer}, 
+\helpref{wxStaticBoxSizer}{wxstaticboxsizer},
+\helpref{wxNotebookSizer}{wxnotebooksizer}, \helpref{wxGridSizer}{wxgridsizer} 
+and \helpref{wxFlexGridSizer}{wxflexgridsizer}.
 
 The layout algorithm used by sizers in wxWindows is closely related to layout
 in other GUI toolkits, such as Java's AWT, the GTK toolkit or the Qt toolkit. It is
@@ -98,7 +101,7 @@ their obvious meaning). With proportional resize, a child may also be centered
 in the main orientation using wxALIGN\_CENTER\_VERTICAL (same as
 wxALIGN\_CENTRE\_VERTICAL) and wxALIGN\_CENTER\_HORIZONTAL (same as
 wxALIGN\_CENTRE\_HORIZONTAL) flags. Finally, you can also specify
-wxAGJUST\_MIN flag to make the minimal size of the control dynamically adjust
+wxADJUST\_MINSIZE flag to make the minimal size of the control dynamically adjust
 to the value returned by its \helpref{GetBestSize()}{wxwindowgetbestsize}
 method - this allows, for example, for correct relayouting of a static text
 control even if its text is changed during run-time.}
