X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d0a0dbd57d066328e16861d197c8307cc13241da..304b9d52cf2a01372ed0e83bd062812ad7d77c78:/docs/latex/wx/locale.tex

diff --git a/docs/latex/wx/locale.tex b/docs/latex/wx/locale.tex
index 46c6c681a0..a8d51c9378 100644
--- a/docs/latex/wx/locale.tex
+++ b/docs/latex/wx/locale.tex
@@ -389,7 +389,7 @@ description of this behaviour. Note that this flag is meaningless in Unicode bui
 
 \docparam{szName}{The name of the locale. Only used in diagnostic messages.}
 
-\docparam{szShort}{The standard 2 letter locale abbreviation and is used as the
+\docparam{szShort}{The standard 2 letter locale abbreviation; it is used as the
 directory prefix when looking for the message catalog files.}
 
 \docparam{szLocale}{The parameter for the call to setlocale(). Note that it is
