X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/d09dd96e31ab84de80d4560dfc7b0d77bb6248a3..388413fca806e70b03c60b510698ee166ba5168c:/docs/latex/wx/settings.tex

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index 163b7c2a87..135bc915e8 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -18,7 +18,7 @@ and user interface element sizes.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxSystemSettings::wxSystemSettings}
+\membersection{wxSystemSettings::wxSystemSettings}\label{wxsystemsettingsctor}
 
 \func{}{wxSystemSettings}{\void}
 
@@ -99,7 +99,8 @@ standalone function named {\tt wxSystemSettings\_GetFont}}
 
 \func{static int}{GetMetric}{\param{wxSystemMetric}{ index}}
 
-Returns a system metric.
+Returns the value of a system metric, or -1 if the metric is not
+supported on the current platform.
 
 {\it index} can be one of:
 
